From c9aefa81ca1950121d2357fc66afe15eb400f537 Mon Sep 17 00:00:00 2001
From: Leonardo Bishop <me@leonardobishop.com>
Date: Fri, 15 Mar 2024 00:13:40 +0000
Subject: Fix eslint errors

---
 components/loader/LoaderFileSystemButton.vue | 13 +++++++++----
 1 file changed, 9 insertions(+), 4 deletions(-)

(limited to 'components/loader/LoaderFileSystemButton.vue')

diff --git a/components/loader/LoaderFileSystemButton.vue b/components/loader/LoaderFileSystemButton.vue
index 3a70860..58c470c 100644
--- a/components/loader/LoaderFileSystemButton.vue
+++ b/components/loader/LoaderFileSystemButton.vue
@@ -27,14 +27,19 @@ const openFileSystemPrompt = async () => {
     console.error(e);
     loaderStore.setFileSystemLoaderStatus('invalid');
   }
-}
+};
 </script>
 
 <template>
   <ClientOnly>
-    <Button type="solid" :icon="['fas', 'folder-open']" label="Load" @click="openFileSystemPrompt"
-      :disabled="!canUseFsApi" />
+    <Button
+      type="solid"
+      :icon="['fas', 'folder-open']"
+      label="Load"
+      @click="openFileSystemPrompt"
+      :disabled="!canUseFsApi"
+    />
 
     <LoaderFileSystemModal ref="fileSystemModal" />
   </ClientOnly>
-</template>
\ No newline at end of file
+</template>
-- 
cgit v1.2.3-70-g09d2

