From c9aefa81ca1950121d2357fc66afe15eb400f537 Mon Sep 17 00:00:00 2001
From: Leonardo Bishop <me@leonardobishop.com>
Date: Fri, 15 Mar 2024 00:13:40 +0000
Subject: Fix eslint errors

---
 layouts/default.vue | 5 ++---
 1 file changed, 2 insertions(+), 3 deletions(-)

(limited to 'layouts/default.vue')

diff --git a/layouts/default.vue b/layouts/default.vue
index fef2da1..01e8484 100644
--- a/layouts/default.vue
+++ b/layouts/default.vue
@@ -1,5 +1,4 @@
-<script setup lang="ts">
-</script>
+<script setup lang="ts"></script>
 
 <template>
   <SiteHeader />
@@ -23,4 +22,4 @@
 #content {
   width: 100%;
 }
-</style>
\ No newline at end of file
+</style>
-- 
cgit v1.2.3-70-g09d2

