From 9a11e0f4a38297006b89cc7bb2a60734111582e0 Mon Sep 17 00:00:00 2001
From: Leonardo Bishop <me@leonardobishop.com>
Date: Sun, 10 Mar 2024 00:13:25 +0000
Subject: Migrate to nuxt

---
 src/components/Control/Checkbox.vue | 42 -------------------------------------
 1 file changed, 42 deletions(-)
 delete mode 100644 src/components/Control/Checkbox.vue

(limited to 'src/components/Control/Checkbox.vue')

diff --git a/src/components/Control/Checkbox.vue b/src/components/Control/Checkbox.vue
deleted file mode 100644
index e0325e7..0000000
--- a/src/components/Control/Checkbox.vue
+++ /dev/null
@@ -1,42 +0,0 @@
-<script setup lang="ts">
-const model = defineModel();
-
-defineProps({
-  id: String,
-  label: String,
-  description: String,
-});
-
-</script>
-
-<template>
-  <div class="checkbox">
-    <label id="wrapper" :for="id">
-      <input :id="id" type="checkbox" v-model="model" />
-      <span id="label">{{ label }}</span>
-      <span id="description">{{ description }}</span>
-    </label>
-  </div>
-</template>
-
-<style scoped>
-#label {
-  display: block;
-  font-weight: bold;
-}
-
-#description {
-  display: block;
-  font-size: 0.8em;
-}
-
-input {
-  float: left;
-  margin: 5px 0 0 -20px;
-}
-
-.checkbox {
-  padding: 0 0 0 20px;
-}
-
-</style>
\ No newline at end of file
-- 
cgit v1.2.3-70-g09d2

